; The contents of this file are subject to the Interbase Public
; License Version 1.0 (the "License"); you may not use this file
; except in compliance with the License. You may obtain a copy
; of the License at http://www.Inprise.com/IPL.html
;
; Software distributed under the License is distributed on an
; "AS IS" basis, WITHOUT WARRANTY OF ANY KIND, either express
; or implied. See the License for the specific language governing
; rights and limitations under the License.
;
; The Original Code was created by Inprise Corporation
; and its predecessors. Portions created by Inprise Corporation are
; Copyright (C) Inprise Corporation.
;
; All Rights Reserved.
; Contributor(s): ______________________________________.

EXPORTS
	IB_UDF_abs
	IB_UDF_acos
	IB_UDF_ascii_char
	IB_UDF_ascii_val
	IB_UDF_asin
	IB_UDF_atan
	IB_UDF_atan2
	IB_UDF_bin_and
	IB_UDF_bin_or
	IB_UDF_bin_xor
	IB_UDF_ceiling
	IB_UDF_cos
	IB_UDF_cosh
	IB_UDF_cot
	IB_UDF_div
	IB_UDF_floor
	IB_UDF_ln
	IB_UDF_log
	IB_UDF_log10
	IB_UDF_lower
	IB_UDF_lpad
	IB_UDF_ltrim
	IB_UDF_mod
	IB_UDF_pi
	IB_UDF_rand
	IB_UDF_rpad
	IB_UDF_rtrim
	IB_UDF_sign
	IB_UDF_sin
	IB_UDF_sinh
	IB_UDF_sqrt
	IB_UDF_srand
	IB_UDF_substr
	IB_UDF_strlen
	IB_UDF_tan
	IB_UDF_tanh
	IB_UDF_substrlen
	IB_UDF_frac
