; The contents of this file are subject to the Interbase Public
; License Version 1.0 (the "License"); you may not use this file
; except in compliance with the License. You may obtain a copy
; of the License at http://www.Inprise.com/IPL.html
;
; Software distributed under the License is distributed on an
; "AS IS" basis, WITHOUT WARRANTY OF ANY KIND, either express
; or implied. See the License for the specific language governing
; rights and limitations under the License.
;
; The Original Code was created by Inprise Corporation
; and its predecessors. Portions created by Inprise Corporation are
; Copyright (C) Inprise Corporation.
;
; All Rights Reserved.
; Contributor(s): ______________________________________.

LIBRARY ib_udf

DESCRIPTION 'InterBase UDF Library'

DATA READ WRITE

EXPORTS
	IB_UDF_abs		@1
	IB_UDF_acos		@2
	IB_UDF_ascii_char	@3
	IB_UDF_ascii_val	@4
	IB_UDF_asin		@5
	IB_UDF_atan		@6
	IB_UDF_atan2		@7
	IB_UDF_bin_and		@8
	IB_UDF_bin_or		@9
	IB_UDF_bin_xor		@10
	IB_UDF_ceiling		@11
	IB_UDF_cos		@12
	IB_UDF_cosh		@13
	IB_UDF_cot		@14
	IB_UDF_div		@15
	IB_UDF_floor		@17
	IB_UDF_ln		@18
	IB_UDF_log		@19
	IB_UDF_log10		@20
	IB_UDF_lower		@21
	IB_UDF_ltrim		@22
	IB_UDF_mod		@23
	IB_UDF_pi		@24
	IB_UDF_rand		@26
	IB_UDF_rtrim		@27
	IB_UDF_sign		@28
	IB_UDF_sin		@29
	IB_UDF_sinh		@30
	IB_UDF_sqrt		@31
	IB_UDF_substr		@32
	IB_UDF_strlen		@33
	IB_UDF_tan		@34
	IB_UDF_tanh		@35
	IB_UDF_substrlen	@36
